η -6 -5 -4 -3 -2 -1 0 1 2 3 4 5 6 η

/d_{ch}Nd

0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200_{ALICE (PRL 106 (2011) 032301)}

ATLAS (PLB 710 (2012) 363-382) CMS (JHEP 1108 (2011) 141)

ALICE symmetrized Double Gaussian fit

0-5% 5-10% 10-20% 20-30%